From 81dcd195ac57fd89ef79d02e467e9fa86024b416 Mon Sep 17 00:00:00 2001
From: Philipp Le <philipp-le-prviat@freenet.de>
Date: Thu, 15 Apr 2021 09:08:56 +0200
Subject: Typo fixes

---
 chapter02/content_ch02.tex | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'chapter02/content_ch02.tex')

diff --git a/chapter02/content_ch02.tex b/chapter02/content_ch02.tex
index d596c93..dbcbf62 100644
--- a/chapter02/content_ch02.tex
+++ b/chapter02/content_ch02.tex
@@ -995,6 +995,8 @@ The constants can be moved in front of the integrals.
 	\end{equation}
 \end{definition}
 
+x
+
 \begin{definition}{Integration of the Fourier transform}
 	\begin{equation}
 		\mathcal{F}\left\{\int\limits_{t'= -\infty}^{t} \underline{f}(t') \, \mathrm{d} t' \right\} = \frac{1}{j \omega} \underbrace{\underline{F} \left(j \omega\right)}_{= \mathcal{F}\left\{\underline{f}(t)\right\}}
@@ -1002,6 +1004,8 @@ The constants can be moved in front of the integrals.
 	\end{equation}
 \end{definition}
 
+x
+
 \begin{excursus}{Network analysis of reactive electrical circuits}
 	Linear, reactive electrical networks are analysed using the Fourier transform.
 	
-- 
cgit v1.1

