From 131fa9edf8cb3b0bf7daa2f9b0b7331aeec5c814 Mon Sep 17 00:00:00 2001
From: Philipp Le <philipp-le-prviat@freenet.de>
Date: Thu, 27 May 2021 02:52:09 +0200
Subject: WIP Chapter 8

---
 common/acronym.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'common/acronym.tex')

diff --git a/common/acronym.tex b/common/acronym.tex
index e8f4658..a883e8e 100644
--- a/common/acronym.tex
+++ b/common/acronym.tex
@@ -60,6 +60,7 @@
 	\acro{ENOB}{effective number of bits}
 	\acro{ETSI}{European Telecommunications Standards Institue}
 	\acro{FCC}{Federal Communications Commission}
+	\acro{FEC}{forward error correction}
 	\acro{FDL}{field bus data link}
 	\acro{FDP}{first detected path}
 	\acro{FDD}{frequency-division duplex}
-- 
cgit v1.1

