From 7415629cde3b98b8ebd86d99542db9ff909382dd Mon Sep 17 00:00:00 2001
From: Philipp Le <philipp-le-prviat@freenet.de>
Date: Sun, 3 May 2020 16:13:40 +0200
Subject: WIP: Electromagnetic spectrum

---
 common/acronym.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'common/acronym.tex')

diff --git a/common/acronym.tex b/common/acronym.tex
index c9cdd78..1587284 100644
--- a/common/acronym.tex
+++ b/common/acronym.tex
@@ -55,6 +55,7 @@
 	\acro{IR}{impulse radio}
 	\acro{ISI}{inter-symbol interference}
 	\acro{ISM}{industrial, scientific and medical}
+	\acro{ITU}{International Telecommunication Union}
 	\acro{LBS}{location based service}
 	\acro{LFSR}{linear feedback shift register}
 	\acro{LNA}{low noise amplifier}
@@ -122,6 +123,7 @@
 	\acro{UDP}{user datagram protocol}
 	\acro{UERE}{user equivalent range error}
 	\acro{UDP}{User Datagram Protocol}
+	\acro{UN}{United Nations}
 	\acro{USB}{Universal Serial Bus}
 	\acro{UTC}{Coordinated Universal Time}
 	\acro{UWB}{ultra-wide band}
-- 
cgit v1.1

