From b1a22abfe12b001c1832911da178be87684f62d4 Mon Sep 17 00:00:00 2001
From: Philipp Le <philipp-le-prviat@freenet.de>
Date: Thu, 4 Jun 2020 01:22:08 +0200
Subject: WIP Chapter 5: Complex Mixing

---
 common/acronym.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'common/acronym.tex')

diff --git a/common/acronym.tex b/common/acronym.tex
index 06d52d2..c605c5a 100644
--- a/common/acronym.tex
+++ b/common/acronym.tex
@@ -69,6 +69,7 @@
 	\acro{HF}{high frequency}
 	\acro{HPF}{high pass filter}
 	\acro{HTTP}{Hypertext Transfer Protocol}
+	\acro{I}{in-phase}
 	\acro{IC}{integrated circuit}
 	\acro{ID}{identification}
 	\acro{IEEE}{Institute of Electrical and Electronics Engineers}
@@ -125,6 +126,7 @@
 	\acro{PPDU}{physical layer protocol data unit}
 	\acro{PSDU}{physical layer service data unit}
 	\acro{PSK}{phase-shift keying}
+	\acro{Q}{quadrature}
 	\acro{QAM}{quadrature amplitude modulation}
 	\acro{QED}{quod erat demonstrandum}
 	\acro{QOS}{quality of service}
-- 
cgit v1.1

