From bd46ac42d8e913f3a7cbb82e46e0a619941c5fc3 Mon Sep 17 00:00:00 2001
From: Philipp Le <philipp-le-prviat@freenet.de>
Date: Thu, 11 Jun 2020 01:32:18 +0200
Subject: WIP: Chapter 6 - Down-sampling

---
 common/acronym.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'common/acronym.tex')

diff --git a/common/acronym.tex b/common/acronym.tex
index 7dbed4d..3a6be50 100644
--- a/common/acronym.tex
+++ b/common/acronym.tex
@@ -57,6 +57,7 @@
 	\acro{EIRP}{effective isotropic radiated power}
 	\acro{ELF}{extremely low frequency}
 	\acro{EMC}{electromagnetic compatibility}
+	\acro{ENOB}{effective number of bits}
 	\acro{ETSI}{European Telecommunications Standards Institue}
 	\acro{FCC}{Federal Communications Commission}
 	\acro{FDL}{field bus data link}
-- 
cgit v1.1

