From c5661a96f15707d338b3b94a7a90947ea1fcee32 Mon Sep 17 00:00:00 2001
From: Philipp Le <philipp-le-prviat@freenet.de>
Date: Wed, 10 Jun 2020 00:19:01 +0200
Subject: WIP: Chapter 6 - Digital Mixer

---
 common/acronym.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'common/acronym.tex')

diff --git a/common/acronym.tex b/common/acronym.tex
index 321e675..7dbed4d 100644
--- a/common/acronym.tex
+++ b/common/acronym.tex
@@ -32,6 +32,7 @@
 	\acro{CDMA}{code-division multiple access}
 	\acro{CEP}{circular error probablilty}
 	\acro{CFR}{channel frequency response}
+	\acro{CIC}{cascaded integrator-comb}
 	\acro{CIR}{channel impulse response}
 	\acro{CMF}{channel matched filter}
 	\acro{CPU}{central processing unit}
@@ -115,6 +116,7 @@
 	\acro{MMSE}{minimum mean square error}
 	\acro{MQTT}{message queuing telemetry transport}
 	\acro{MU}{mobile unit}
+	\acro{NCO}{nummerically-controlled oscillator}
 	\acro{NLOS}{non-line-of-sight}
 	\acro{OFDM}{orthogonal frequency-division multiplexing}
 	\acro{OFDMA}{orthogonal frequency-division multiple access}
-- 
cgit v1.1

